University of Toronto, Faculty of Applied Science and Engineering Department of Electrical and Computer Engineering ECE 241 F - Project Description and Appr oval Form Below give a brief description of your project and the times you expect to accomplish it’s different parts. Name:_________________________________________________________________ Name:_________________________________________________________________ Project Title: ______________________________________________________________

Block Diagram & Point Form Description:

Milestones to be done b y the End of Pr oject Lab #1:

Milestones to be done b y the End of Pr oject Lab #2:

Milestones to be done b y the End of Pr oject Lab #3:

Approved By (TA/Instructor): _________________________ Date:_______________